``++SYNCHRONIZE++`` was introduced by Oracle as a recovery mechanism in case there is a loss of synchronization between what is in memory and what is displayed. It works but it comes with a price; each call to ``++SYNCHRONIZE++`` generates a network round-trip between the server and the Forms client. Most of the time it should be avoided or used with caution as explicitly stated in the Oracle Forms documentation.


== Noncompliant Code Example

----
SYNCHRONIZE;
----

