include::../summary.adoc[]

== Why is this an issue?

include::../rationale.adoc[]

include::../impact.adoc[]

// How to fix it section

include::how-to-fix-it/buffer-overflow.adoc[]

== Resources

include::../common/resources/articles.adoc[]

include::../common/resources/standards.adoc[]

include::../common/resources/guidelines.adoc[]


ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

=== Message

"vsnprintf" overflows write buffer "rawData()..."; passed size "blabla..." (256) exceeds buffer size (14)


'''
== Comments And Links
(visible only on this page)

=== relates to: S3519

endif::env-github,rspecator-view[]
