include::../../../shared_content/dotnet/csharp_dictionary.adoc[]
:language: csharp

== Why is this an issue?

include::../description.adoc[]

include::../exceptions.adoc[]

include::./how-mstest.adoc[]

include::./how-nunit.adoc[]

include::../resources.adoc[]

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

=== Message

Replace the "ExpectedException" attribute with a throw assertion or a "try/catch" block.


=== Highlighting

ExpectedException attribute


'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]

endif::env-github,rspecator-view[]
