== Why is this an issue?

include::../description.adoc[]

=== Noncompliant code example

With the default threshold of 5:

[source,go]
----
func foo(tag int) {
	switch tag {
	case 0:
		methodCall1()
		methodCall2()
		methodCall3()
		methodCall4()
                methodCall5()
                methodCall6()
	case 1:
		bar()
	}
}
----

=== Compliant solution

[source,go]
----
func foo(tag int) {
	switch tag {
	case 0:
		executeAll()
	case 1:
		bar()
	}
}

func executeAll() {
	methodCall1()
	methodCall2()
	methodCall3()
	methodCall4()
        methodCall5()
        methodCall6()
}
----

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

include::../parameters.adoc[]

'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]

endif::env-github,rspecator-view[]
