== Why is this an issue?

Assertions comparing an object to itself are more likely to be bugs due to developer's carelessness.


This rule raises an issue when the actual expression matches the expected expression.

=== Noncompliant code example

[source,php]
----
assertEqual($a, $a); // Noncompliant
assertSame($a, $a); // Noncompliant
assertNotEqual($a, $a); // Noncompliant
assertNotSame($a, $a); // Noncompliant
----

=== Compliant solution

[source,php]
----
assertEqual($expected, $a);
assertSame($expected, $a);
assertNotEqual($expected, $a);
assertNotSame($expected, $a);
----

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

=== Message

Replace this assertion to not have the same actual and expected expression.


=== Highlighting

Primary: expected expression


Secondary: actual expression


'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]

endif::env-github,rspecator-view[]
