=== on 7 Sep 2016, 17:55:47 Ann Campbell wrote:
\[~tamas.vajk] IMO we need to remove this exception (and possibly rename the parameter for clarity?)

=== on 9 Sep 2016, 08:13:09 Tamas Vajk wrote:
\[~ann.campbell.2] All the other languages have this exception, and the parameter name is also similar there. Why do you think we'd need to fix these issues?

include::../comments-and-links.adoc[]
