The ``++DISPLAY++`` statement outputs data to standard out or some other destination and could reveal sensitive information. Therefore, it should be avoided.


== Noncompliant Code Example

----
DISPLAY "hello world"  *> Noncompliant
----


== See

* https://www.owasp.org/index.php/Top_10-2017_A3-Sensitive_Data_Exposure[OWASP Top 10 2017 Category A3] - Sensitive Data Exposure
* https://cwe.mitre.org/data/definitions/489.html[MITRE, CWE-489] - Active Debug Code

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::message.adoc[]

include::parameters.adoc[]

include::highlighting.adoc[]

'''
== Comments And Links
(visible only on this page)

include::comments-and-links.adoc[]
endif::env-github,rspecator-view[]
