When a given "props" is used more than once in a component, there is great chance it's a mistake and so the behavior of the application won't be the one expected.


== Compliant Solution

----
<Hello firstname="John" 
           lastname="Doe" />
----


ifdef::env-github,rspecator-view[]
'''
== Comments And Links
(visible only on this page)

include::comments-and-links.adoc[]
endif::env-github,rspecator-view[]
