include::../description.adoc[]

== Noncompliant Code Example

----
curl_setopt($curl, CURLOPT_SSL_VERIFYHOST, FALSE); // Noncompliant
curl_setopt($curl, CURLOPT_SSL_VERIFYHOST, 0);  // Noncompliant
----

== Compliant Solution

----
curl_setopt($curl, CURLOPT_SSL_VERIFYHOST, 2); // Compliant; default value is 2 to "check the existence of a common name and also verify that it matches the hostname provided" according to PHP's documentation
curl_setopt($curl, CURLOPT_SSL_VERIFYHOST, TRUE); // Compliant: starting from 7.66.0: treats 1 and 2 the same (https://curl.haxx.se/libcurl/c/CURLOPT_SSL_VERIFYHOST.html)
----

include::../see.adoc[]

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]
endif::env-github,rspecator-view[]
