ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

== Message

Remove this empty alternative.

== Highlighting

The | should be highlighted. For || the first bar should be highlighted.

'''

endif::env-github,rspecator-view[]
