== Why is this an issue?

include::../description.adoc[]

=== Noncompliant code example

[source,php]
----
if ($x < 0) {
  new foo;  // Noncompliant
}
----

=== Compliant solution

[source,php]
----
$var = NULL;
if ($x < 0) {
  $var = new foo;
}
----

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]

endif::env-github,rspecator-view[]
