== Why is this an issue?

:func_name: method

include::../description.adoc[]

[source,vbnet,diff-id=1,diff-type=noncompliant]
----
Private Const CODE As String = "bounteous"
Private callCount As Integer = 0

Public Function GetCode() As String
  callCount = callCount + 1
  Return CODE
End Function

Public Function GetName() As String ' Noncompliant: duplicates GetCode
  callCount = callCount + 1
  Return CODE
End Function
----

include::../inter.adoc[]

[source,vbnet,diff-id=1,diff-type=compliant]
----
Private Const CODE As String = "bounteous"
Private callCount As Integer = 0

Public Function GetCode() As String
  callCount = callCount + 1
  Return CODE
End Function

Public Function GetName() As String ' Intent is clear
  Return GetCode()
End Function
----

=== Exceptions

Empty methods, methods with only one line of code and methods with the same name (overload) are ignored.

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

include::../highlighting.adoc[]

'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]

endif::env-github,rspecator-view[]
