``++SELECT INTO TABLE++`` is much more efficient than ``++SELECT ... ENDSELECT++``. ``++SELECT INTO TABLE++`` needs more memory to hold the result set, but in normal situations, this is not a concern. When memory is a concern, the result set can be divided into smaller sets.


== Noncompliant Code Example

----
SELECT * FROM T006 INTO X006_WA.
  ...
ENDSELECT.
----


== Compliant Solution

----
SELECT * FROM T006 INTO TABLE X006.
LOOP AT X006 INTO X006_WA.
  ...
ENDLOOP.
----


ifdef::env-github,rspecator-view[]
== Comments And Links
(visible only on this page)

include::comments-and-links.adoc[]
endif::env-github,rspecator-view[]
