== Why is this an issue?

:operationName: function

include::../description.adoc[]

== How to fix it

=== Code examples

==== Noncompliant code example

[source,go,diff-id=1,diff-type=noncompliant]
----
func shouldNotBeEmpty() {  // Noncompliant - method is empty
}

func notImplemented() {  // Noncompliant - method is empty
}

func emptyOnPurpose() {  // Noncompliant - method is empty
}
----

==== Compliant solution

[source,go,diff-id=1,diff-type=compliant]
----
func shouldNotBeEmpty() {
  doSomething();
}

func notImplemented() {
  return "", errors.New("notImplemented() cannot be performed because ...")
}

func emptyOnPurpose() {
  // comment explaining why the method is empty
}
----

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

=== Message

Add a nested comment explaining why this function is empty or complete the implementation.


'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]

endif::env-github,rspecator-view[]
