When this flag is disabled, it allows the application to load and execute content from any source, including potentially unsafe ones. 
This vulnerability can be exploited when a user interacts with untrusted web content, such as clicking on a malicious link or opening a compromised webpage. 
The attacker can then inject harmful scripts or code into the application, bypassing the usual security restrictions. 
