:true: true
:false: false
:ops: !, &&, ||, ==, !=
== Why is this an issue?

include::../description.adoc[]

=== Code examples

==== Noncompliant code example

[source,scala,diff-id=1,diff-type=noncompliant]
----
if (booleanMethod() || false) { /* ... */ }
doSomething(!false)

booleanVariable = if (booleanMethod()) true else false
booleanVariable = if (booleanMethod()) true else exp
booleanVariable = if (booleanMethod()) false else exp
booleanVariable = if (booleanMethod()) exp else true
booleanVariable = if (booleanMethod()) exp else false
----

==== Compliant solution

[source,scala,diff-id=1,diff-type=compliant]
----
if (booleanMethod()) { /* ... */ }
doSomething(true)

booleanVariable = booleanMethod()
booleanVariable = booleanMethod() || exp
booleanVariable = !booleanMethod() && exp
booleanVariable = !booleanMethod() || exp
booleanVariable = booleanMethod() && exp
----

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

'''

endif::env-github,rspecator-view[]
