== Why is this an issue?

When only the condition expression is defined in a ``++for++`` loop, and the initialization and increment expressions are missing, a ``++while++`` loop should be used instead to increase readability. 

include::../noncompliant.adoc[]

include::../compliant.adoc[]

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]

endif::env-github,rspecator-view[]
