ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

=== Message

Remove this unread private field 'xxxx' or refactor the code to use its value.

=== Highlighting

* primary: Field name declaration
* secondary: Statements changing its value

'''
== Comments And Links
(visible only on this page)

=== relates to: S1144

=== relates to: S1854

=== on 15 Oct 2019, 10:44:10 Andrei Epure wrote:
Note that:

* the implementation of this rule only considers fields. Other members (e.g. properties)  are considered by the RSPEC-1144 C# implementation.
* to avoid overlap of this rule with RSPEC-1450, the RSPEC-1450 C# implementation has been modified to only raise when the field is written before being read

endif::env-github,rspecator-view[]
