include::../description.adoc[]

include::../noncompliant.adoc[]

== Exceptions

When a block contains a comment, this block is not considered to be empty unless it is a ``synchronized`` block. ``synchronized`` blocks are still considered empty even with comments because they can still affect program flow.
