== Why is this an issue?

When ``++match++`` expressions have a large number of clauses, it is usually an attempt to map two sets of data. A real map structure would be more readable and maintainable, and should be used instead.

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

include::../parameters.adoc[]

'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]

endif::env-github,rspecator-view[]
