== Why is this an issue?

include::../description.adoc[]

=== Noncompliant code example

[source,php]
----
$password = ...

if (md5($password) === '1f3870be274f6c49b3e31a0c6728957f') { // Noncompliant; md5() hashing algorithm is not secure for password management
   [...]
}

if (sha1($password) === 'd0be2dc421be4fcd0172e5afceea3970e2f3d940') { // Noncompliant; sha1() hashing algorithm is not secure for password management
   [...]
}
----

include::../see.adoc[]

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]

endif::env-github,rspecator-view[]
