NUnit ``++TestFixture++``s may only have one ``++[SetUp]++`` method. Any more than that and the ``++TestFixture++`` will compile but not run.


== Noncompliant Code Example

----
namespace NUnit.Tests
{
  using System;
  using NUnit.Framework;

  [TestFixture]
  public class MyTests
  {
    [SetUp] public void Init()
    { /* ... */ }

    [Setup] public void Prep()  // Noncompliant
    { /* ... */ }
  }
}
----


ifdef::env-github,rspecator-view[]
'''
== Comments And Links
(visible only on this page)

include::comments-and-links.adoc[]
endif::env-github,rspecator-view[]
