== Why is this an issue?

Subqueries bypass the SAP table buffer. You should, if possible, only use simple ``++SELECT++``s with buffered tables to avoid the risk of the buffer being bypassed.

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

=== Message

Remove this subquery.


endif::env-github,rspecator-view[]
