== Why is this an issue?

include::../description.adoc[]

=== Noncompliant code example

With the default threshold of 3:

[source,php]
----
  if (condition1) {                  // Compliant - depth = 1
    ...
    if (condition2) {                // Compliant - depth = 2
      ...
      for($ = 0; $i < 10; $i++) {  // Compliant - depth = 3, not exceeding the limit
        ...
        if (condition4) {            // Non-Compliant - depth = 4
          if (condition5) {          // Depth = 5, exceeding the limit, but issues are only reported on depth = 4
            ...
          }
          return;
        }
      }
    }
  }
----

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

=== Parameters

.max
****
_Integer_

----
4
----

Maximum allowed control flow statement nesting depth.
****


include::../highlighting.adoc[]

'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]
endif::env-github,rspecator-view[]
