== Why is this an issue?

When the Python parser fails, it is possible to record the failure as a violation on the file. This way, not only it is possible to track the number of files that do not parse but also to easily find out why they do not parse.

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]

endif::env-github,rspecator-view[]
