The == and != operators do type coercion before comparing. This is bad because it causes ' \t\r\n' == 0 to be true. This can mask type errors. It is best to not use == and != and to always use the more reliable === and !== operators instead.

ifdef::env-github,rspecator-view[]

'''
== Comments And Links
(visible only on this page)

include::comments-and-links.adoc[]

endif::env-github,rspecator-view[]
