You can easily call a JavaScript function with more arguments than the function needs, but the extra arguments will be just ignored by function execution.

== Noncompliant Code Example

[source,javascript]
----
function say(a, b) {
  print(a + " " + b);
}

say("hello", "world", "!"); // Noncompliant; last argument is not used
----

== Exceptions

No issue is reported when ``++arguments++`` is used in the body of the function being called.

[source,javascript]
----
function doSomething(a, b) {
  compute(arguments);
}

doSomething(1, 2, 3) // Compliant
----

include::../see.adoc[]

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

include::highlighting.adoc[]

'''
== Comments And Links
(visible only on this page)

include::comments-and-links.adoc[]
endif::env-github,rspecator-view[]
