=== Standards

* https://owasp.org/Top10/A01_2021-Broken_Access_Control/[OWASP Top 10 2021 Category A1] - Broken Access Control
* https://www.owasp.org/index.php/Top_10-2017_A5-Broken_Access_Control[OWASP Top 10 2017 Category A5] - Broken Access Control
* https://cwe.mitre.org/data/definitions/20[MITRE, CWE-20] - Improper Input Validation
* https://cwe.mitre.org/data/definitions/601[MITRE, CWE-601] - URL Redirection to Untrusted Site ('Open Redirect')