When two methods have the same implementation, either it was a mistake - something else was intended - or the duplication was intentional, but may be confusing to maintainers. In the latter case, one implementation should invoke the other.

== Noncompliant Code Example

[source,csharp]
----
private const string CODE = "bounteous";
private int callCount = 0;

public string GetCode() 
{
  callCount++;
  return CODE;
}

public string GetName()  // Noncompliant
{
  callCount++;
  return CODE;
}
----

== Compliant Solution

[source,csharp]
----
private const string CODE = "bounteous";
private int callCount = 0;

public string GetCode() 
{
  callCount++;
  return CODE;
}

public string GetName() 
{
  return GetCode();
}
----

== Exceptions

Empty methods, methods with only one line of code and methods with the same name (overload) are ignored.

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

include::../highlighting.adoc[]

'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]
endif::env-github,rspecator-view[]
