Many assertions compare two objects or properties of these objects. Passing twice the same argument is likely to be a bug due to developer's carelessness.


This rule raises an issue when a Chai assertion is given twice the same argument.

== Noncompliant Code Example

[source,javascript]
----
const assert = require('chai').assert;

describe("test the same object", function() {
    it("uses chai 'assert'", function() {
        const expected = '1'
        const actual = (1).toString()
        assert.equal(actual, actual);  // Noncompliant
    });
});
----

== Compliant Solution

[source,javascript]
----
const assert = require('chai').assert;

describe("test the same object", function() {
    it("uses chai 'assert'", function() {
        const expected = '1'
        const actual = (1).toString()
        assert.equal(actual, expected);
    });
});
----

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

include::highlighting.adoc[]

'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]
endif::env-github,rspecator-view[]
