The following predefined variables are deprecated and should be replaced by the new versions:

||Replace||With||

|$HTTP_SERVER_VARS|$_SERVER|

|$HTTP_GET_VARS|$_GET|

|$HTTP_POST_VARS|$_POST|

|$HTTP_POST_FILES|$_FILES|

|$HTTP_SESSION_VARS|$_SESSION|

|$HTTP_ENV_VARS|$_ENV|

|$HTTP_COOKIE_VARS|$_COOKIE|

|$php_errormsg|error_get_last()|


== Noncompliant Code Example

----
echo 'Name parameter value: ' . $HTTP_GET_VARS["name"];
----


== Compliant Solution

----
echo 'Name parameter value: ' . $_GET["name"];
----



ifdef::env-github,rspecator-view[]
== Comments And Links
(visible only on this page)

include::comments-and-links.adoc[]
endif::env-github,rspecator-view[]
