== Why is this an issue?

:operationName: method
:emptyCode: vbnet/empty-code.adoc
:notsupportedCode: vbnet/notsupported-code.adoc
:notimplementedCode: vbnet/notimplemented-code.adoc
:commentCode: vbnet/comment-code.adoc

include::../why-dotnet.adoc[]

=== Exceptions

The following empty methods are considered compliant:

* empty `Overridable` methods, as the implementation might not be required in the base class
* empty methods that override a `MustOverride` method as the implementation is mandatory for child class
* empty overrides in test assemblies for mocking purposes

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

=== Message

Add a nested comment explaining why this method is empty, throw a NotSupportedException or complete the implementation.


'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]
endif::env-github,rspecator-view[]
