== Why is this an issue?

My main fear here is to start generating some false-positives.


Waiting for feedback from BNP



ifdef::env-github,rspecator-view[]
'''
== Comments And Links
(visible only on this page)

=== on 27 May 2014, 09:43:18 Freddy Mallet wrote:
As discussed with BNP, this rule will generate too many false-positives.

endif::env-github,rspecator-view[]
