== Why is this an issue?

Passing a collection as an argument to the collection's own method is either an error - some other argument was intended - or simply nonsensical code.

[source,csharp]
----
var list = new List<int>();

list.AddRange(list);          // Noncompliant
list.Concat(list);            // Noncompliant

list.Union(list);             // Noncompliant: always returns list
list.Except(list);            // Noncompliant: always empty
list.Intersect(list);         // Noncompliant: always list
list.SequenceEqual(list);     // Noncompliant: always true

var set = new HashSet<int>();
set.UnionWith(set);           // Noncompliant: no changes
set.ExceptWith(set);          // Noncompliant: always empty
set.IntersectWith(set);       // Noncompliant: no changes
set.IsProperSubsetOf(set);    // Noncompliant: always false
set.IsProperSupersetOf(set);  // Noncompliant: always false
set.IsSubsetOf(set);          // Noncompliant: always true
set.IsSupersetOf(set);        // Noncompliant: always true
set.Overlaps(set);            // Noncompliant: always true
set.SetEquals(set);           // Noncompliant: always true
set.SymmetricExceptWith(set); // Noncompliant: always empty
----

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

=== Message

* Change one instance of '{0}' to a different value; This operation always produces [an empty/the same] collection.
* Change one instance of '{0}' to a different value; comparing '{0}' to itself always returns [true|false].
* Change one instance of '{0}' to a different value; This operation will probably result in an unexpected behavior.


'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]
endif::env-github,rspecator-view[]
