== Why is this an issue?

:func_name: method

include::../description.adoc[]

[source,csharp,diff-id=1,diff-type=noncompliant]
----
private const string CODE = "secret";
private int callCount = 0;

public string GetCode() 
{
  callCount++;
  return CODE;
}

public string GetName() // Noncompliant: duplicates GetCode
{
  callCount++;
  return CODE;
}
----

include::../inter.adoc[]

[source,csharp,diff-id=1,diff-type=compliant]
----
private const string CODE = "secret";
private int callCount = 0;

public string GetCode() 
{
  callCount++;
  return CODE;
}

public string GetName() // Intent is clear
{
  return GetCode();
}
----

=== Exceptions

Empty methods, methods with only one line of code and methods with the same name (overload) are ignored.

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

include::../highlighting.adoc[]

'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]
endif::env-github,rspecator-view[]
