In encryption, when Cipher Block Chaining (CBC) is used, the Initialization Vector (IV) must be random and unpredictable. Otherwise, the encrypted value is vulnerable to crypto-analysis attacks such as the "Chosen-Plaintext Attack".

An IV value should be associated to one, and only one encryption cycle, because the IV's purpose is to ensure that the same plaintext encrypted twice will yield two different ciphertexts.

To that end, IV's should be:

* random
* unpredictable
* publishable (IVs are frequently published)
* authenticated, along with the ciphertext, with a Message Authentication Code (MAC)

This rule raises an issue when the IV is:

* hard-coded
* created using ``java.util.Random`` rather than ``java.security.SecureRandom``.

== Noncompliant Code Example

----
public class MyCbcClass {

  public String applyCBC(String strKey, String plainText) {
    byte[] bytesIV = "7cVgr5cbdCZVw5WY".getBytes("UTF-8");

    /* KEY + IV setting */
    IvParameterSpec iv = new IvParameterSpec(bytesIV);
    SecretKeySpec skeySpec = new SecretKeySpec(strKey.getBytes("UTF-8"), "AES");

    /* Ciphering */
    Cipher cipher = Cipher.getInstance("AES/CBC/PKCS5PADDING");
    cipher.init(Cipher.ENCRYPT_MODE, skeySpec, iv);  // Noncompliant because IV hard coded and cannot vary with each ciphering round
    byte[] encryptedBytes = cipher.doFinal(plainText.getBytes("UTF-8"));
    return DatatypeConverter.printBase64Binary(bytesIV) // IV is typically published
            + ";" + DatatypeConverter.printBase64Binary(encryptedBytes);
  }
}
----

== Compliant Solution

----
public class MyCbcClass {

  SecureRandom random = new SecureRandom();

  public String applyCBC(String strKey, String plainText) {
    byte[] bytesIV = new byte[16];
    random.nextBytes(bytesIV);

    /* KEY + IV setting */
    IvParameterSpec iv = new IvParameterSpec(bytesIV);
    SecretKeySpec skeySpec = new SecretKeySpec(strKey.getBytes("UTF-8"), "AES");

    /* Ciphering */
    Cipher cipher = Cipher.getInstance("AES/CBC/PKCS5PADDING");
    cipher.init(Cipher.ENCRYPT_MODE, skeySpec, iv);
    byte[] encryptedBytes = cipher.doFinal(plainText.getBytes("UTF-8"));
    return DatatypeConverter.printBase64Binary(bytesIV)
            + ";" + DatatypeConverter.printBase64Binary(encryptedBytes);
  }
}
----

== See

* http://cwe.mitre.org/data/definitions/330[MITRE, CWE-330] - Use of Insufficiently Random Values 
* OWASP Top 10 2017 Category A6 - Security Misconfiguration 
* Derived from FindSecBugs rule https://find-sec-bugs.github.io/bugs.htm#STATIC_IV[STATIC_IV]
