Specifying the default value for an annotation parameter is redundant. Such values should be omitted in the interests of readability.

== Noncompliant Code Example

----
@MyAnnotation(arg = "def")  // Noncompliant
public class MyClass {
  // ...
}
public @interface MyAnnotation {
  String arg() default "def";
}
----

== Compliant Solution

----
@MyAnnotation
public class MyClass {
  // ...
}
public @interface MyAnnotation {
  String arg() default "def";
}
----
