== Why is this an issue?

``++file_uploads++`` is an on-by-default PHP configuration that allows files to be uploaded to your site. Since accepting [.line-through]#candy# files from strangers is inherently dangerous, this feature should be disabled unless it is absolutely necessary for your site.


This rule raises an issue when ``++file_uploads++`` is not explicitly disabled.


=== Noncompliant code example

[source,php]
----
; php.ini
file_uploads=1  ; Noncompliant
----


=== Compliant solution

[source,php]
----
; php.ini
file_uploads=0
----


== Resources

* OWASP - https://owasp.org/www-project-top-ten/2017/A6_2017-Security_Misconfiguration[Top 10 2017 Category A6 - Security Misconfiguration]
* CWE - https://cwe.mitre.org/data/definitions/434[CWE-434 - Unrestricted Upload of File with Dangerous Type]


ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

=== Message

* Explicitly disable "file_uploads".
* Update this configuration to disable "file_uploads".


'''
== Comments And Links
(visible only on this page)

=== on 1 Sep 2015, 06:41:40 Linda Martin wrote:
\[~ann.campbell.2] from the sentence "This rule raises an issue when file_uploads *is not explicitly disabled.*" I understand taht the rule it will not raise any issue if and only if the following line is present in the file: "file_uploads=*0*" is correct ? 

I yes, maybe a compliant code snippet could be aded, WDYT ?

=== on 1 Sep 2015, 13:51:36 Ann Campbell wrote:
Of course you're right [~linda.martin]. Done.

=== on 1 Sep 2015, 14:44:55 Linda Martin wrote:
\[~ann.campbell.2] thanks ou! LGTM!

endif::env-github,rspecator-view[]
