== Why is this an issue?

include::../description.adoc[]

=== Noncompliant code example

[source,csharp]
----
bool b = true;
NUnit.Framework.Assert.AreEqual(true, b);
Xunit.Assert.NotSame(true, b);
Microsoft.VisualStudio.TestTools.UnitTesting.Assert.AreEqual(true, b);
System.Diagnostics.Debug.Assert(true);
----

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]

endif::env-github,rspecator-view[]
