include::../description.adoc[]

//Mitigation precision for PHP
Since PHP allows different types of HTTP parameters, the problem could be
mitigated by ensuring that the type of the input is a String or by sanitizing
the user-provided data.

include::../see.adoc[]

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

include::../highlighting.adoc[]

endif::env-github,rspecator-view[]
