Cognitive Complexity is a measure of how hard the control flow of a method is to understand. Methods with high Cognitive Complexity will be difficult to maintain.

include::../see.adoc[]
ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::message.adoc[]

include::parameters.adoc[]

include::../highlighting.adoc[]

endif::env-github,rspecator-view[]
