=== is duplicated by: S915

=== is duplicated by: S918

=== relates to: S3458

=== is related to: S3532

=== is related to: S3562

=== on 8 May 2013, 10:53:53 Freddy Mallet wrote:
when there is a default clause but this one is not the last clause, the following message must be displayed:

* "default" clause should be the last one.

=== on 10 Jul 2013, 11:43:59 Dinesh Bolkensteyn wrote:
Implemented by \http://jira.codehaus.org/browse/SONARJAVA-200

=== on 22 Nov 2013, 09:23:49 Freddy Mallet wrote:
Is implemented by \http://jira.sonarsource.com/browse/RSPEC-131 for Flex

=== on 12 Feb 2014, 22:04:27 Freddy Mallet wrote:
Is implemented by \http://jira.codehaus.org/browse/SONARPLUGINS-3472 for PHP

=== on 9 Dec 2014, 22:20:33 Evgeny Mandrikov wrote:
\[~ann.campbell.2] MISRA C:2012 has rule 16.5 (A default label shall appear as either the first or the last switch label of a switch statement), which I can't find in RSPEC. Question is - should we simply reference it from this spec, thus increasing coverage of MISRA for free? or we should create dedicated implementation?

=== on 10 Dec 2014, 13:01:22 Ann Campbell wrote:
\[~evgeny.mandrikov] my vote would be to add the references here. 


Surely 2012 isn't the only year to have such a rule...?

=== on 10 Dec 2014, 13:15:33 Ann Campbell wrote:
\[~evgeny.mandrikov] in fact, this is the rule. It appears that references were mistyped initially. 

