== Why is this an issue?

Because they are very difficult to maintain, programs with too many lines of code should be split into smaller programs or subprograms.


ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

=== Parameters

.maximumLinesOfCodeThreshold
****

----
1500
----

The maximum number of lines of code above which a program should be split
****


'''
== Comments And Links
(visible only on this page)

=== on 29 May 2015, 13:05:39 Ann Campbell wrote:
double-check me, [~pierre-yves.nicolas]

=== on 29 May 2015, 15:15:29 Pierre-Yves Nicolas wrote:
I changed the SQALE factor to 2min per line.

endif::env-github,rspecator-view[]
