A method that grows too large tends to aggregate too many responsibilities. Such method inevitably become harder to understand and therefore harder to maintain.


Above a specific threshold, it is strongly advised to refactor into smaller methods which focus on well-defined tasks. Those smaller methods will not only be easier to understand, but also probably easier to test.

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

include::../parameters.adoc[]

'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]
endif::env-github,rspecator-view[]
