Because of the way it's architected, Internet Explorer has hard limits on the size and complexity of the stylesheets it can support. Each sheet may only ``++@import++`` 31 other sheets. Anything beyond those limits won't be suppported. 

ifdef::env-github,rspecator-view[]

'''
== Comments And Links
(visible only on this page)

include::comments-and-links.adoc[]

endif::env-github,rspecator-view[]
