Cognitive Complexity is a measure of how hard the control flow of a function is to understand. Coroutines with high Cognitive Complexity will be difficult to maintain.


== See

* https://www.sonarsource.com/docs/CognitiveComplexity.pdf[Cognitive Complexity]

