== Why is this an issue?

``++PERFORM paragraph1++`` is preferred over ``++PERFORM paragraph1 THRU paragraph2++`` because it adheres more closely to the structured programming precepts of having a single entry point and a single exit point. Additionally, mixing the two approaches can lead to errors. 

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

=== Message

Use "PERFORM" instead


endif::env-github,rspecator-view[]
