== Why is this an issue?

ifdef::env-github,rspecator-view[]

'''
== Comments And Links
(visible only on this page)

=== on 23 Dec 2014, 21:05:15 Evgeny Mandrikov wrote:
Replaced by RSPEC-1103.


endif::env-github,rspecator-view[]
