Nested ``++switch++`` structures are difficult to understand because you can easily confuse the cases of an inner ``++switch++`` as belonging to an outer statement. Therefore nested ``++switch++`` statements should be avoided.


Specifically, you should structure your code to avoid the need for nested ``++switch++`` statements, but if you cannot, then consider moving the inner ``++switch++`` to another function.