include::../description.adoc[]

include::../ask-yourself.adoc[]

== Recommended Secure Coding Practices

Do not enable debugging features on production servers

``++WITH DEBUGGING MODE++`` activates all debug lines (ones with 'D' or 'd' in the indicator area). This clause should not be used in production.

== Sensitive Code Example

----
SOURCE-COMPUTER. IBM-370 WITH DEBUGGING MODE.
----

== Compliant Solution

[source,cobol]
----
SOURCE-COMPUTER. IBM-370.
----

include::../see.adoc[]

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

=== Message

Make sure this debug clause is removed before delivering the code in production.


'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]

endif::env-github,rspecator-view[]
